Cvičení: Řady funkcí - stejnoměrná konvergence:

• Rozhodněte o stejnoměrné konvergenci např. užitím Weierstrassových kritérií: ∞∑ n=1 sin(nx) (n^4 + x^4)^13 , x ∈ R

• ∞∑ n=1 n^2 √ n! (x^n + x^{−n}) , x ∈< 1 2 , 2 >

• ∞∑ n=1 arctan( 2x x^2 + n^3 ) , x ∈ R • Rozhodněte o stejnoměrné konvergenci např. užitím Abelova resp. Dirichletova kritérií: ∞∑ n=1 sin(nx) √ n , x ∈< c, 2π − c > , c ∈ (0, π)

• ∞∑ n=2 (−)^n 1 n + sin x , x ∈< 0, 2π >

• ∞∑ n=1 (−)^n n − 1 n + 1 1 n^1100 e^{−nx} , x ∈< 0, ∞)

• ∞∑ n=1 (−)^n 1 n^x , x ∈< α, ∞ > , α ∈ (0, ∞) • Rozhodněte o bodové a stejnoměrné konvergenci funkčních řad: f(x) = ∞∑ n=1 (x + 1 n )^n , x ∈ R

• f(x) = ∞∑ n=1 x + (−)^nn x^2 + n^2 , x ∈ R • Spočtěte a zdůvodněte (ne)platnost: lim x→1− ∞∑ n=1 (x^n − x^{n+1})^?= ∞∑ n=1 lim x→1− (x^n − x^{n+1})

• Bud’ f_n(x) = x^{12n+1} − x^{12n−1} . Rozhodněte a zdůvodněte (ne)platnost

∫_1 0 ∞∑ n=1 f_n(x)dx^?= ∞∑ n=1 ∫_1 0 f_n(x)dx